1.21.62.02.42.83.23.6

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 21662)

0 1 2 3 4 5 Profile Number

2.02.42.83.23.64.04.4

Charge Consumption (kC)

050100150200250

Sleep Period (Hours)

45.047.550.052.555.057.560.0

Wake Period (Minutes)