Time Series of High Pressure Pump Time (Float 1518)

1030

1040

1050

1060

1070

1080

1090

1100

1110

1120

Pumping Time (seconds)

0.0 0.4 0.8 1.2 1.6 2.0 Profile Number

As of 04 Oct 2025